; libwmpplayer.def : 声明 DLL 的模块参数。

; LIBRARY      "libwmpplayer"

; EXPORTS
    ; 此处可以是显式导出
    

; VideoPlayDlg1
; VideoPlayDlg2
; ClosePlayDlg
